1e-05

1e-04

0.001

0.01 0.1

1

10

100 1000 10000 100000 1e+06 1e+07 post error estimate degrees of freedom

Comparison L-shape-P2.log <-> L-shape-P2-uniform.log

L-shape-P2.log L2 L-shape-P2-uniform.log L2 DOF^{-3/3} L-shape-P2.log H1 L-shape-P2-uniform.log H1 DOF^{-2/3}